0c01500c01104000000000000000000000000001
0c01500c12204000000000000000000000000002
     RANGE SELECTION  -  allows you to determine ranges, such as  "First"
     to "Fa" for alphabetical fields, or 23 to 123 for ENTRY#.  It is very
     powerful and allows quite precise selections of output.  Additional
     selections narrow the range.  To use it, choose the field that you want
     to select by, then a range.  For example, for ENTRY# you might pick a
     range between 231 and 467, to generate a report in that range.  You can
     tighten up the noose on the selections by adding more ranges. If it
     becomes too constricting, ESCape back to the main menu then retry.
0c01500c01104000000000000000000000000003
0c01500c01104000000000000000000000000004
0c01500c01104000000000000000000000000005
0c01500c01104000000000000000000000000006
0c01500c01104000000000000000000000000007
0101501732204000000000000000000000000008   Reporting Help

   Reports on database structure and comparisons can be send to some
   destinations in various orders and subsets, or in complete form.
   You can use your mouse, the arrow keys, or tap the matching
   capitalised letter for your target entry.


   The reports choices are:

   Range selections:  to narrow the set or subset of entries to be
   displayed.  Eg. for one database, or some databases, or one field
   name or some field names.

   Select alternate key:  The default key is the order the database
   entries were imported into the system.  You may rekey or reorder
   by database name or field name.

   Select Device:   choices are Lpt1, Lpt2, COM ports, and a file.
   Normally LPT1 is the most reasonable choice for a printer port.
                                                                 [more below]
   Select Printer:  from a choice from daisy wheel, through dot
   matrix to Postscript.

   Check paper alignment:  to verify paper alignment before a full
   printer run.

   Print the report:   to send the report output to a printer,
   the screen, or to a file.

   eXit:  to return to the DBFED program.

   The colour differences that show up in the output reports indicate
   different printer output.  Red is bold.
0c01500c01104000000000000000000000000009
0c01500c0110400000000000000000000000000a
0c01500c0110400000000000000000000000000b
0c0150061220400000000000000000000000000c  Use the PGDN and PGUP keys and the arrow keys or mouse to move about
  the report.  Any odd colours or graphics are formatting for things
  like Bold printing.
